import { FormGroup, Input } from 'reactstrap';
import classNames from 'classnames';
import { ToggleSwitch } from '../utils/ToggleSwitch';
import { SimpleCard } from '../utils/SimpleCard';
import { FormText } from '../utils/forms/FormText';
import { LabeledFormGroup } from '../utils/forms/LabeledFormGroup';
import type { Settings } from './reducers/settings';
import { useDomId } from '../utils/helpers/hooks';

interface RealTimeUpdatesProps {
  settings: Settings;
  toggleRealTimeUpdates: (enabled: boolean) => void;
  setRealTimeUpdatesInterval: (interval: number) => void;
}

const intervalValue = (interval?: number) => (!interval ? '' : `${interval}`);

export const RealTimeUpdatesSettings = (
  { settings: { realTimeUpdates }, toggleRealTimeUpdates, setRealTimeUpdatesInterval }: RealTimeUpdatesProps,
) => {
  const inputId = useDomId();

  return (
    <SimpleCard title="Real-time updates" className="h-100">
      <FormGroup>
        <ToggleSwitch checked={realTimeUpdates.enabled} onChange={toggleRealTimeUpdates}>
          Enable or disable real-time updates.
          <FormText>
            Real-time updates are currently being <b>{realTimeUpdates.enabled ? 'processed' : 'ignored'}</b>.
          </FormText>
        </ToggleSwitch>
      </FormGroup>
      <LabeledFormGroup
        noMargin
        label="Real-time updates frequency (in minutes):"
        labelClassName={classNames('form-label', { 'text-muted': !realTimeUpdates.enabled })}
        id={inputId}
      >
        <Input
          type="number"
          min={0}
          placeholder="Immediate"
          disabled={!realTimeUpdates.enabled}
          value={intervalValue(realTimeUpdates.interval)}
          id={inputId}
          onChange={({ target }) => setRealTimeUpdatesInterval(Number(target.value))}
        />
        {realTimeUpdates.enabled && (
          <FormText>
            {realTimeUpdates.interval !== undefined && realTimeUpdates.interval > 0 && (
              <span>
                Updates will be reflected in the UI
                every <b>{realTimeUpdates.interval}</b> minute{realTimeUpdates.interval > 1 && 's'}.
              </span>
            )}
            {!realTimeUpdates.interval && 'Updates will be reflected in the UI as soon as they happen.'}
          </FormText>
        )}
      </LabeledFormGroup>
    </SimpleCard>
  );
};
